(* Init. code displays a requester if program was started from workbench *)

(*  _________________________ *)
(* |			    | *)
(* | RUNTIME ERROR:	    | *)
(* | This program will only | *)
(* | run from the CLI/SHELL | *)
(* |			    | *)
(* |	    |EXIT|	    | *)
(* |________________________| *)

DEFINITION MODULE CliOnly ;
END CliOnly.
